CREATE TABLE pages (
    roof varchar(2048) DEFAULT '',
    red_status smallint DEFAULT -1
);

-- roof VARCHAR(2048) CHARACTER SET utf8mb4 DEFAULT '' COLLATE `utf8mb4_unicode_ci`